The following is the summary of my work in the week of Nov 21 - Nov 28. 

	1. Finished the review letter for the microarchitecture configuration 
	   and floorplanning co-optimizaiton journal paper. 

	2. Summarized the review comments from the FPGA conference and outlined
	   the work need to do for DAC. 

	3. Worked on feedback control for PFM to precisely control the voltage 
	   level. Just finished to build a primitive op amp. In the process of  
	   verifying its functionility. 
